01234567891032.0

28.0

24.0

9:02:20.0

16.0

19:00.0

30.0

-40:20:00.0

21:00.0

22:00.0

RA (J2000)

Dec (J2000)

OBSID 00618134000 / DATE-OBS 2014-11-10T03:58:30.2

UVOT Finding Chart