0246810121416182024.0

14:51:20.0

16.0

12.0

47:20:00.0

30.0

19:00.0

18:00.0

RA (J2000)

Dec (J2000)

OBSID 00620090000 / DATE-OBS 2014-11-30T23:16:15.4

UVOT Finding Chart