0123456744.0

2:36:40.0

36.0

32.0

30.0

18:10:00.0

09:00.0

08:00.0

07:30.0

RA (J2000)

Dec (J2000)

OBSID 00621229000 / DATE-OBS 2014-12-12T12:18:59.5

UVOT Finding Chart