0102030405060708044.0

17:06:40.0

36.0

32.0

30.0

24:00:00.0

59:00.0

23:58:00.0

57:30.0

RA (J2000)

Dec (J2000)

OBSID 00621278000 / DATE-OBS 2014-12-13T02:10:43.9

UVOT Finding Chart