051015202516.0

12.0

08.0

04.0

9:15:00.0

30.0

48:00.0

33:47:00.0

46:00.0

45:30.0

RA (J2000)

Dec (J2000)

OBSID 00622476000 / DATE-OBS 2014-12-25T23:15:38.9

UVOT Finding Chart