010203040506038.0

34.0

20:50:30.0

26.0

45:00.0

30.0

36:44:00.0

43:00.0

42:00.0

RA (J2000)

Dec (J2000)

OBSID 00623158000 / DATE-OBS 2015-01-01T06:43:21.8

UVOT Finding Chart