010203040506070809034.0

19:17:30.0

26.0

22.0

30.0

32:00.0

31:00.0

32:30:00.0

29:30.0

RA (J2000)

Dec (J2000)

OBSID 00624606000 / DATE-OBS 2015-01-10T22:22:59.2

UVOT Finding Chart