0123456718.0

14.0

0:41:10.0

34:00:00.0

30.0

59:00.0

33:58:00.0

57:30.0

RA (J2000)

Dec (J2000)

OBSID 00627137000 / DATE-OBS 2015-01-20T03:02:54.3

UVOT Finding Chart