0510152025303522.0

18.0

14.0

13:51:10.0

39:30.0

-8:40:00.0

30.0

41:00.0

42:00.0

RA (J2000)

Dec (J2000)

OBSID 00629693000 / DATE-OBS 2015-02-04T00:15:19.9

UVOT Finding Chart