02040608010012.0

06.0

19:02:00.0

30.0

25:00.0

47:24:00.0

23:00.0

RA (J2000)

Dec (J2000)

OBSID 00630876000 / DATE-OBS 2015-02-12T11:27:43.9

UVOT Finding Chart