05101520253058.0

54.0

16:53:50.0

46.0

42.0

13:00.0

30.0

12:00.0

11:00.0

34:10:00.0

09:30.0

RA (J2000)

Dec (J2000)

OBSID 00631051000 / DATE-OBS 2015-02-13T22:36:54.4

UVOT Finding Chart