010203040506070809010017:49:00.0

56.0

52.0

48:48.0

-20:20:00.0

30.0

21:00.0

22:00.0

23:00.0

RA (J2000)

Dec (J2000)

OBSID 00631946000 / DATE-OBS 2015-02-21T00:59:07.5

UVOT Finding Chart