01020304050607019:35:00.0

56.0

52.0

34:48.0

30.0

54:00.0

21:53:00.0

52:00.0

51:30.0

RA (J2000)

Dec (J2000)

OBSID 00632158000 / DATE-OBS 2015-02-22T12:18:05.6

UVOT Finding Chart