0510152028.0

24.0

0:45:20.0

16.0

12.0

53:00.0

30.0

52:00.0

51:00.0

41:50:00.0

49:30.0

RA (J2000)

Dec (J2000)

OBSID 00633105000 / DATE-OBS 2015-03-01T06:25:29.2

UVOT Finding Chart