0.51.52.53.5455.0

9:15:50.0

45.0

40.0

35.0

30.0

28:00.0

55:27:00.0

26:00.0

RA (J2000)

Dec (J2000)

OBSID 00635148000 / DATE-OBS 2015-03-17T04:37:14.5

UVOT Finding Chart