010203040506070809010010.0

21:40:00.0

39:50.0

25:30.0

26:00.0

30.0

-61:27:00.0

28:00.0

RA (J2000)

Dec (J2000)

OBSID 00635289000 / DATE-OBS 2015-03-18T07:19:30.1

UVOT Finding Chart