010203040506052.0

46.0

19:58:40.0

34.0

30.0

33:00.0

35:32:00.0

31:00.0

30:30.0

RA (J2000)

Dec (J2000)

OBSID 00635790000 / DATE-OBS 2015-03-22T08:27:00.3

UVOT Finding Chart