010203040506036.0

17:05:30.0

24.0

04:30.0

05:00.0

30.0

-37:06:00.0

07:00.0

RA (J2000)

Dec (J2000)

OBSID 00635795000 / DATE-OBS 2015-03-22T09:22:08.0

UVOT Finding Chart