01234567891052.0

46.0

8:32:40.0

34.0

30.0

29:00.0

45:28:00.0

27:00.0

26:30.0

RA (J2000)

Dec (J2000)

OBSID 00635887000 / DATE-OBS 2015-03-23T02:54:42.1

UVOT Finding Chart