0246810121416182020:46:10.0

20:46:00.0

41:30.0

-62:42:00.0

30.0

43:00.0

RA (J2000)

Dec (J2000)

OBSID 00637044000 / DATE-OBS 2015-04-03T21:55:55.1

UVOT Finding Chart