0102030405060708012.0

08.0

04.0

17:48:00.0

45:00.0

30.0

-24:46:00.0

47:00.0

48:00.0

RA (J2000)

Dec (J2000)

OBSID 00637212000 / DATE-OBS 2015-04-05T18:25:09.2

UVOT Finding Chart