34.0

18:13:30.0

26.0

22.0

18.0

54:30.0

55:00.0

30.0

-33:56:00.0

57:00.0

58:00.0

RA (J2000)

Dec (J2000)

OBSID 00637807000 / DATE-OBS 2015-04-12T09:02:53.4

UVOT Finding Chart