01234567816:42:00.0

54.0

48.0

41:42.0

30:30.0

31:00.0

30.0

-45:32:00.0

33:00.0

RA (J2000)

Dec (J2000)

OBSID 00639199000 / DATE-OBS 2015-04-27T14:32:53.3

UVOT Finding Chart