010203040506070809012.0

06.0

21:50:00.0

31:00.0

30.0

57:30:00.0

29:00.0

28:30.0

RA (J2000)

Dec (J2000)

OBSID 00642018000 / DATE-OBS 2015-05-30T11:44:17.9

UVOT Finding Chart