010203040506012.0

08.0

04.0

17:47:00.0

00:30.0

01:00.0

30.0

-32:02:00.0

03:00.0

RA (J2000)

Dec (J2000)

OBSID 00643078000 / DATE-OBS 2015-06-10T12:00:32.5

UVOT Finding Chart