024681012141612.0

08.0

04.0

20:24:00.0

30.0

52:00.0

51:00.0

33:50:00.0

49:30.0

RA (J2000)

Dec (J2000)

OBSID 00643949000 / DATE-OBS 2015-06-15T18:37:34.0

UVOT Finding Chart