0.20.40.60.81.21.41.61.82.212.0

06.0

20:24:00.0

30.0

53:00.0

33:52:00.0

51:00.0

50:30.0

RA (J2000)

Dec (J2000)

OBSID 00644520000 / DATE-OBS 2015-06-18T00:48:13.6

UVOT Finding Chart