02468101224.0

7:25:20.0

16.0

45:30.0

46:00.0

30.0

-37:47:00.0

48:00.0

RA (J2000)

Dec (J2000)

OBSID 00646603000 / DATE-OBS 2015-06-26T02:18:14.2

UVOT Finding Chart