0510152025303540455010.0

10:45:00.0

44:50.0

30.0

56:00:00.0

59:00.0

55:58:00.0

RA (J2000)

Dec (J2000)

OBSID 00647642000 / DATE-OBS 2015-07-02T07:13:49.1

UVOT Finding Chart