010203040506024.0

18:41:20.0

16.0

12.0

54:30.0

55:00.0

30.0

-4:56:00.0

57:00.0

RA (J2000)

Dec (J2000)

OBSID 00649113000 / DATE-OBS 2015-07-15T18:27:22.1

UVOT Finding Chart