01020304050607024.0

7:58:20.0

16.0

12.0

14:00.0

30.0

-28:15:00.0

16:00.0

17:00.0

RA (J2000)

Dec (J2000)

OBSID 00649706000 / DATE-OBS 2015-07-20T14:04:46.4

UVOT Finding Chart