05101520253035404514.0

19:29:10.0

06.0

02.0

30.0

55:00.0

33:54:00.0

53:00.0

RA (J2000)

Dec (J2000)

OBSID 00650617000 / DATE-OBS 2015-07-28T13:05:53.4

UVOT Finding Chart