510152025303556.0

53.0

5:31:50.0

47.0

22:00.0

30.0

-5:23:00.0

24:00.0

RA (J2000)

Dec (J2000)

OBSID 00650977000 / DATE-OBS 2015-08-01T22:43:27.4

UVOT Finding Chart