0246810121428.0

24.0

19:25:20.0

16.0

24:00.0

30.0

-15:25:00.0

26:00.0

27:00.0

RA (J2000)

Dec (J2000)

OBSID 00651882000 / DATE-OBS 2015-08-11T04:11:29.8

UVOT Finding Chart