0510152025303540455038.0

34.0

16:38:30.0

26.0

02:00.0

30.0

-12:03:00.0

04:00.0

05:00.0

RA (J2000)

Dec (J2000)

OBSID 00652334000 / DATE-OBS 2015-08-17T03:11:23.1

UVOT Finding Chart