0510152025303540455004.0

0:41:00.0

56.0

40:52.0

30.0

06:00.0

41:05:00.0

04:00.0

03:30.0

RA (J2000)

Dec (J2000)

OBSID 00652824000 / DATE-OBS 2015-08-21T03:26:49.0

UVOT Finding Chart