051015202530354012.0

08.0

04.0

14:44:00.0

36:30.0

37:00.0

30.0

-25:38:00.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 00653838000 / DATE-OBS 2015-08-31T10:35:56.3

UVOT Finding Chart