0246810121448.0

44.0

4:29:40.0

36.0

30.0

46:00.0

5:45:00.0

44:00.0

43:30.0

RA (J2000)

Dec (J2000)

OBSID 00655262000 / DATE-OBS 2015-09-11T18:45:30.8

UVOT Finding Chart