0102030405060708048.0

44.0

16:19:40.0

36.0

47:30.0

48:00.0

30.0

49:00.0

-15:50:00.0

51:00.0

RA (J2000)

Dec (J2000)

OBSID 00655449000 / DATE-OBS 2015-09-13T11:24:35.0

UVOT Finding Chart