010203040506070809010011044.0

16:19:40.0

36.0

32.0

47:30.0

48:00.0

30.0

49:00.0

-15:50:00.0

51:00.0

RA (J2000)

Dec (J2000)

OBSID 00655451000 / DATE-OBS 2015-09-13T11:40:09.2

UVOT Finding Chart