051015202530354045505515:35:00.0

56.0

52.0

34:48.0

30.0

59:00.0

10:58:00.0

57:00.0

RA (J2000)

Dec (J2000)

OBSID 00657286000 / DATE-OBS 2015-10-01T15:18:54.5

UVOT Finding Chart