0102030405030.0

14:14:20.0

10.0

55:30.0

56:00.0

30.0

-64:57:00.0

58:00.0

RA (J2000)

Dec (J2000)

OBSID 00657564000 / DATE-OBS 2015-10-04T19:09:32.8

UVOT Finding Chart