01020304050609:50:00.0

50.0

40.0

49:30.0

30.0

31:00.0

70:30:00.0

29:00.0

RA (J2000)

Dec (J2000)

OBSID 00657750000 / DATE-OBS 2015-10-06T10:09:50.4

UVOT Finding Chart