0246810121438.0

34.0

22:30:30.0

10:30.0

11:00.0

30.0

-33:12:00.0

13:00.0

RA (J2000)

Dec (J2000)

OBSID 00660671000 / DATE-OBS 2015-10-21T01:31:07.3

UVOT Finding Chart