05101520253035404523:17:00.0

50.0

16:40.0

55:50:00.0

30.0

49:00.0

48:00.0

47:30.0

RA (J2000)

Dec (J2000)

OBSID 00661036000 / DATE-OBS 2015-10-22T14:21:05.0

UVOT Finding Chart