024681012141632.0

28.0

24.0

3:47:20.0

16.0

08:30.0

09:00.0

30.0

-44:10:00.0

11:00.0

RA (J2000)

Dec (J2000)

OBSID 00663074000 / DATE-OBS 2015-11-11T08:34:60.0

UVOT Finding Chart