0510152020.0

10.0

0:08:00.0

40:30.0

41:00.0

30.0

-61:42:00.0

43:00.0

RA (J2000)

Dec (J2000)

OBSID 00663179000 / DATE-OBS 2015-11-12T14:37:27.9

UVOT Finding Chart