024681012141618202214.0

15:17:10.0

06.0

46:00.0

30.0

35:45:00.0

44:00.0

43:30.0

RA (J2000)

Dec (J2000)

OBSID 00666352000 / DATE-OBS 2015-12-05T15:47:57.3

UVOT Finding Chart