0510152025303546.0

2:44:40.0

34.0

28.0

27:30.0

28:00.0

30.0

29:00.0

-43:30:00.0

RA (J2000)

Dec (J2000)

OBSID 00666378000 / DATE-OBS 2015-12-05T22:35:41.6

UVOT Finding Chart