01234567846.0

43.0

22:57:40.0

37.0

06:00.0

30.0

8:05:00.0

04:00.0

03:30.0

RA (J2000)

Dec (J2000)

OBSID 00668641000 / DATE-OBS 2015-12-28T22:52:00.4

UVOT Finding Chart